--
-- PostgreSQL database dump
--

SET statement_timeout = 0;
SET client_encoding = 'UTF8';
SET standard_conforming_strings = off;
SET check_function_bodies = false;
SET client_min_messages = warning;
SET escape_string_warning = off;

--
-- Name: temp; Type: SCHEMA; Schema: -; Owner: -
--

CREATE SCHEMA temp;


--
-- PostgreSQL database dump complete
--

